2 4 6 8 10

e→ e / c,b →c) →b(

0.2 0.4 0.6 0.8 1 1.2 1.4 = 2.76 TeV s ALICE pp,

(a)

e-h (|y|<0.7) FONLL

factorization Tk GM-VFNS

IP (|y|<0.8)

)c (GeV/ Tp 2 4 6 8 10

)^2)c dy) (mb/(GeV/ T p /(dσ^2) d_Tpπ

1/(2

-7 10 -6 10 -5 10 -4 10 -3 10 e→ c) → e-h, b (

= 2.76 TeV s ALICE pp,

(b) e→ c) → IP, b ( e→ c)→

IP, b (